From ea2819b2c2f1fbb9bf85010602758166530939ce Mon Sep 17 00:00:00 2001
From: Ryan <fauxpark@gmail.com>
Date: Mon, 26 Sep 2022 14:40:15 +1000
Subject: Change `{LED,RGB}_DISABLE_TIMEOUT` to `{LED,RGB}_MATRIX_TIMEOUT`
 (#18415)

---
 keyboards/gmmk/pro/rev1/iso/keymaps/vitoni/readme.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'keyboards/gmmk/pro/rev1/iso/keymaps/vitoni/readme.adoc')

diff --git a/keyboards/gmmk/pro/rev1/iso/keymaps/vitoni/readme.adoc b/keyboards/gmmk/pro/rev1/iso/keymaps/vitoni/readme.adoc
index 38a74a568b..c34887ebd2 100644
--- a/keyboards/gmmk/pro/rev1/iso/keymaps/vitoni/readme.adoc
+++ b/keyboards/gmmk/pro/rev1/iso/keymaps/vitoni/readme.adoc
@@ -63,11 +63,11 @@ The code customizing RGB light usage is decribed here:
 
 * link:../../../../../../users/vitoni/readme.adoc[/users/vitoni/readme.adoc]
 
-When using  `RGB_DISABLE_TIMEOUT` addtional options are available:
+When using  `RGB_MATRIX_TIMEOUT` addtional options are available:
 
 * `RGB_FADE_IN` makes the RGB lights fade in instead of setting the value/brightness to 100% (implicitly due to HSV including the brightness) when resuming after RGB lights have been turned off.
 Fade in occurs when the keyboard is initialized and when the RGB brightness has been changed (e.g. suspending, fade out, etc.).
-* `RGB_DISABLE_WITH_FADE_OUT` activates fade out before the keyboard is disabled by `RGB_DISABLE_TIMEOUT`.
+* `RGB_DISABLE_WITH_FADE_OUT` activates fade out before the keyboard is disabled by `RGB_MATRIX_TIMEOUT`.
 
 Parameters used to define the behavior are:
 [%header]
-- 
cgit v1.2.3

