From 83fa6fe916bfd7d337f05d7805f0a51ad86c8b43 Mon Sep 17 00:00:00 2001
From: GloriousThrall <74627436+GloriousThrall@users.noreply.github.com>
Date: Thu, 19 May 2022 19:47:22 -0500
Subject: Move GMMK Pro to allow for multiple revisions (#16423)

* Added GMMK PRO Rev2 WBG7 MCU compatibility. Added GMMK 2 WBG7 MCU compatibility.

* GMMK PRO MCU Updates only (removed other kbs)

* fix problems

* Optimize the code.

* Update form develop branch

* Update

* Updater from qmk/develop

* Update

* Update config.h

* Update config.h

* Remove gmmk pro rev2

* move moults31/keymap.c

* Update

* tidy up

Co-authored-by: Joy <chang.li@westberrytech.com>
Co-authored-by: zvecr <git@zvecr.com>
---
 keyboards/gmmk/pro/iso/keymaps/vitoni/readme.adoc | 104 ----------------------
 1 file changed, 104 deletions(-)
 delete mode 100644 keyboards/gmmk/pro/iso/keymaps/vitoni/readme.adoc

(limited to 'keyboards/gmmk/pro/iso/keymaps/vitoni/readme.adoc')

diff --git a/keyboards/gmmk/pro/iso/keymaps/vitoni/readme.adoc b/keyboards/gmmk/pro/iso/keymaps/vitoni/readme.adoc
deleted file mode 100644
index 38a74a568b..0000000000
--- a/keyboards/gmmk/pro/iso/keymaps/vitoni/readme.adoc
+++ /dev/null
@@ -1,104 +0,0 @@
-= ViToni's keymap for GMMK Pro ISO
-
-== Layout
-Based on the stock layout but making use of CAPS as FN similar to laptop keyboards.
-This frees up the left row for other uses (although not remapped yet).
-Since both Delete and Insert are used for coding they are part of the CAPS layer as well.
-
-The differences are as follows:
-
-=== Layer 0 (`_BASE`)
-Mostly stock + CAPS goes to layer `_MOV`.
-FN toggles the layer `_RGB`.
-
-=== Layer 1 (`_MOV`), accessed by pressing `CAPS` on layer `_BASE`
-[%header]
-|===
-| Key / Action          | Mapped to
-| ESC                   | _RESET_
-| F1                    | KC_MYCM
-| F2                    | KC_WHOM
-| F3                    | KC_CALC
-| F4                    | KC_MSEL
-| F5                    | KC_MPRV
-| F6                    | KC_MPLY
-| F7                    | KC_MSTP
-| F8                    | KC_MNXT
-| F9                    | KC_MUTE
-| F10                   | KC_VOLD
-| F11                   | KC_VOLU
-| N                     | NK_TOGG
-| Delete                | Insert
-| Left                  | Home
-| Right                 | End
-| Up                    | PgUp
-| Down                  | PgDn
-|===
-
-=== Layer 2 (`_RGB`), accessed by pressing `FN` on layer `_BASE`
-Revamped the stock FN layer to focus on RGB only.
-
-[%header]
-|===
-| Key / Action          | Mapped to
-| Knob clockwise        | Value/Brightness up
-| Knob anti-clockwise   | Value/Brightness down
-| Backspace             | _RESET_
-| Enter                 | RGB_TOG
-| Del                   | RGB_MOD
-| PgUp                  | RGB_RMOD
-| PgDn                  | RGB_SPI
-| End                   | RGB_SPD
-| Left                  | RGB_HUD
-| Right                 | RGB_HUI
-| Up                    | RGB_SAI
-| Down                  | RGB_SAD
-|===
-
-No other changes have been made.
-
-== RGB light
-
-The code customizing RGB light usage is decribed here:
-
-* link:../../../../../../users/vitoni/readme.adoc[/users/vitoni/readme.adoc]
-
-When using  `RGB_DISABLE_TIMEOUT` addtional options are available:
-
-* `RGB_FADE_IN` makes the RGB lights fade in instead of setting the value/brightness to 100% (implicitly due to HSV including the brightness) when resuming after RGB lights have been turned off.
-Fade in occurs when the keyboard is initialized and when the RGB brightness has been changed (e.g. suspending, fade out, etc.).
-* `RGB_DISABLE_WITH_FADE_OUT` activates fade out before the keyboard is disabled by `RGB_DISABLE_TIMEOUT`.
-
-Parameters used to define the behavior are:
-[%header]
-|===
-|Key | Default | Description
-
-| RGB_MATRIX_MAXIMUM_BRIGHTNESS
-| 200 (&lt;= UNIT8_MAX)
-| Maximum assumed value for brightness.
-Used to calculate lead time for fade out before suspend timeout.
-
-|===
-
-`RGB_IDLE_TIMEOUT` enables fading out after being idle for the defined time and allows
-* `RGB_IDLE_BREATHE` also activates a brethe effect while idling.
-
-[%header]
-|===
-|Key | Default | Description
-
-|RGB_IDLE_TIMEOUT
-|4500
-|Time in milliseconds without activity before considered to be idle.
-
-|RGB_IDLE_MINIMUM_BRIGHTNESS
-|`RGB_MATRIX_MAXIMUM_BRIGHTNESS` / 5
-|Brightness value RGB is dimmed to when starting to idle. +
-When breathing used as the lower bound of the brightness value.
-
-|RGB_IDLE_MAXIMUM_BRIGHTNESS
-|`RGB_MATRIX_MAXIMUM_BRIGHTNESS` * 2/5
-|Upper bound of brightness value of the RGB light while breathing.
-
-|===
-- 
cgit v1.2.3

